Copyright: Copyright (c) YAMAHA Corporation All rights reserved.


Synthesizer Effects

The Synthesizer Effects option allows you to enable the MIDI synthesizer. Using the MIDI synthesizer, you can richly enhance the acoustic sound variations with features such as reverberation, chorus and variation. Simply click on the check-box associated with the desired feature.

The MIDI synthesizer utilizes the Wavetable sound generation method, supports the three command-compatible interface modes, and is fully compliant with the XG specification proposed by YAMAHA.

* GM is a trademark of Association of Musical Electronics Industry (AMEI).

* XG is a trademark of Yamaha Corporation.

Reverberation

When selected, the Reverberation option adds a resounding effect to the acoustic sound and provides concert hall ambience to the echo-back sound.

Chorus

The Chorus feature provides a chorale effect to the musical sound.

Variation

Variation allows the alteration of sound effects such as distortion and overdrive. Reverberation and Chorus are also features that can be adjusted using Variation.


Digital Output

Use the Digital Output option to set up digital outputs. Note that digital outputs will not effect the volume control setting configured by the Windows standard Master Volume output. To adjust the volume control for all digital outputs, you need to use external amplifiers.

OFF

Checking this box eliminates all digital outputs. Acoustic sound outputs will only playback at analog signal pins.

ON (Digital Sources Only)

Checking this box enables the wavetable and MIDI acoustic sound output functions at digital signal pins. External inputs including microphone and line are not provided as outputs at digital signal pins. The acoustic sound outputs will playback at analog signal pins.

ON (All Sources) / Analog out is muted

Checking this box eliminates all analog outputs. Acoustic sound outputs will playback at digital signal pins. However, acoustic sound inputs from an external source may be muted during recording.